
Sample survey/questionaire/info forms pulled from various sources.

These have been converted to be used in the Juggernaut Questionaire
system ("AnsQ" and "ShwQ" commands).

These ANSIs have all been run through ANSI-Optimizer, but not hand optimized.

I am using the following numbering scheme for this directory:

  .1## for new user new-user-voting info forms
  .2## for new user sysop-only info forms
  .3## for other info forms
  .4## for other forms


